DECLINATION (B1950)

RIGHT ASCENSION (B1950)

04 28 40.26 40.25 40.24 40.23 40.22

18 01 42.3

42.2

42.1

42.0

41.9

41.8

41.7

41.6

41.5

L1551 VLA-A 7-mm

20 AU