{ 1 {

Table 1: Sublimation temperatures of pure ices^a.

Compound Laboratory Dark cloud core T^{sub}(K) T^{sub}(K) N_2 22 13 O_2 22 13 CO 25 16 CH_4 30 18 CO_2 83 50 NH_3 95 55 CH_3OH 140 80 H_2O 150 90 a From Nakagawa (1978) and Sandford and Allamandola (1993).